jQuery UI filter (6.x-1.0-beta3) - en to unknown language translation catalogue (12 entries)

en: Save configuration
target: Goym samanseting

en: Reset to defaults
target: Tómstilla til standard

en: title
target: yvirskrift

en: Reset
target: Tómstilla

en: The configuration options have been saved.
target: Samansetingarmøguleikarnir eru goymdir.

en: Help
target: Hjálp

en: Update
target: Dagfør

en: The configuration options have been reset to their default values.
target: Samansetingarmøguleikarnar eru tómstillaðir til teirra standardvirði.

en: Contact
target: Kontakt

en: active
target: virkin

en: Show
target: Vís

en: Hide
target: Krógva
