Mobile Switch Block (6.x-1.0-beta1) - en to unknown language translation catalogue (5 entries)

en: User interface
target: Interface do utilizador

en: view
target: ver

en: version
target: versão

en: default
target: predefinido

en: standard
target: padrão
