UCB Events (6.x-1.1) - en to unknown language translation catalogue (9 entries)

en: Title
target: Tajuk

en: Enabled
target: Dibolehkan

en: Link
target: Pautan

en: Updated URL for feed %title to %url.
target: URL suapan %title dikemaskinikan kepada %url.

en: Subtitle
target: Sarikata

en: The feed from %site seems to be broken, because of error "%error".
target: Suapan daripada %site nampaknya rosak, kerana ralat "%error".

en: There is no new syndicated content from %site.
target: Tidak ada kandungan sindikasi baru daripada %site.

en: There is new syndicated content from %site.
target: Terdapat kandungan sindikasi baru daripada %site.

en: The feed from %site seems to be broken, due to "%error".
target: Suapan daripada %site nampaknya rosak, kerana kesalahan "%error".
