UpTime Widget (6.x-1.0) - en to unknown language translation catalogue (4 entries)

en: Enabled
target: Aktivert

en: Error
target: Feil

en: Refresh interval
target: Oppfriskningsintervall

en: @interval ago
target: @interval siden
