UpTime Widget (6.x-1.0) - en to unknown language translation catalogue (5 entries)

en: Enabled
target: Ativado

en: Error
target: Erro

en: Refresh interval
target: Intervalo de atualização

en: API key
target: Chave API

en: @interval ago
target: @interval atrás
