Universally Unique IDentifier (6.x-1.0-rc1) - en to unknown language translation catalogue (4 entries)

en: Disabled
target: À comas

en: Enabled
target: An comas

en: Taxonomy settings
target: Roghainnean an tacsonamaidh

en: User settings
target: Roghainnean a' chleachdaiche
