Webform Campaign Monitor (6.x-1.0) - en to unknown language translation catalogue (5 entries)

en: Yes
target: Sim

en: No
target: Não

en: - None -
target: - Nenhum -

en: Webform
target: Formulário

en: Checked by default
target: Marcado por defeito
