Yahoo YUI (6.x-1.3) - en to unknown language translation catalogue (4 entries)

en: Location of YUI library
target: YUI 函式庫路徑

en: YUI Common Settings
target: YUI 一般設定

en: Default location is Yahoo Server.
target: 預設路徑為存取 Yahoo 伺服器。

en: If you install YUI library locally please enter the path as follows: /yourlocalpath
target: 如果您將 YUI 函式庫安裝在伺服器上，請輸入 YUI 函式庫路徑。例如 /yourlocalpath
