ImageField Focus (7.x-1.0) - en to unknown language translation catalogue (5 entries)

en: High
target: Àrd

en: Low
target: Ìseal

en: Medium
target: Meadhan

en: Minimum height
target: Àirde as lugha

en: Minimum width
target: Leud as lugha
