ImageField Focus (7.x-1.0) - en to unknown language translation catalogue (6 entries)

en: High
target: Tinggi

en: Low
target: Rendah

en: Medium
target: Sederhana

en: Minimum height
target: Ketinggian minimum

en: Minimum width
target: Kelebaran minimum

en: pixels
target: piksel
