ImageField Focus (7.x-1.0) - en to unknown language translation catalogue (6 entries)

en: High
target: Alta

en: Low
target: Baixa

en: Medium
target: Médio

en: Minimum height
target: Altura mínima

en: Minimum width
target: Largura mínima

en: pixels
target: píxeis
