Indic Script (7.x-2.0) - en to unknown language translation catalogue (4 entries)

en: User interface
target: Eadar-aghaidh a' chleachdaiche

en: Enable
target: Cuir an comas

en: Disable
target: Cuir à comas

en: English
target: Beurla
