IPstack (7.x-1.1) - en to unknown language translation catalogue (10 entries)

en: Test
target: Testar

en: No data
target: Sem dados

en: Configure
target: Configurar

en: French
target: Francês

en: Spanish
target: Castelhano

en: Japanese
target: Japonês

en: Output format
target: Formato de saída

en: German
target: Alemão

en: Russian
target: Russo

en: IP address
target: Endereço de IP
