jQuery AJAX Load (7.x-1.1) - en to unknown language translation catalogue (3 entries)

en: Access denied
target: Atgongd noktað

en: Page not found
target: Síða ikki funnin

en: Site under maintenance
target: Heimasíðan verður viðlíkahildin
