jQuery AJAX Load (7.x-1.2) - en to unknown language translation catalogue (6 entries)

en: Test
target: 测试

en: Access denied
target: 拒绝访问

en: Unknown error
target: 未知错误

en: Page not found
target: 页面未找到

en: Loading
target: 正在加载

en: Site under maintenance
target: 网站正在维护
