jQuery UI MultiSelect Widget (7.x-1.0) - en to unknown language translation catalogue (4 entries)

en: User interface
target: Interface de usuário

en: Height
target: Altura

en: Check all
target: Marcar todos

en: Uncheck all
target: Desmarcar todos
