jQuery UI MultiSelect Widget (7.x-1.8) - en to unknown language translation catalogue (5 entries)

en: User interface
target: Interface do utilizador

en: Filter
target: Filtro

en: Height
target: Altura

en: Not installed
target: Não instalado

en: Installed
target: Instalado
