jQuery UI Slider Field (7.x-1.0-alpha1) - en to unknown language translation catalogue (9 entries)

en: User interface
target: Eadar-aghaidh a' chleachdaiche

en: Disable
target: Cuir à comas

en: Default
target: Bun-roghainn

en: Horizontal
target: Air a' chòmhnard

en: Vertical
target: Gu h-inghearach

en: Custom
target: Gnàthaichte

en: Maximum
target: As motha

en: Left
target: Clì

en: Right
target: Deas
