jQuery UI Slider Field (7.x-1.0-alpha2) - en to unknown language translation catalogue (4 entries)

en: User interface
target: Estemal goróyar intharféis

en: Disable
target: Naqabil

en: Default
target: Asási

en: Custom
target: Háaic mozin
