LimeSurvey Sync (7.x-3.0) - en to unknown language translation catalogue (1 entry)

en: Your Drupal site and your LimeSurvey site are synchronized (checked on the @date).
target: Your Drupal site and your LimeSurvey site are synchronised (checked on the @date).
