Link checker (7.x-1.0-beta1) - en to unknown language translation catalogue (16 entries)

en: Save configuration
target: Goym samanseting

en: Reset to defaults
target: Tómstilla til standard

en: Operations
target: Atgerðir

en: Disabled
target: Óvirkjað

en: Settings
target: Setingar

en: General settings
target: Almennar setingar

en: Preview
target: Undansýning

en: Error
target: Feilur

en: Set @type %title to unpublished.
target: Set @type %title til at vera tikin aftur.

en: Depends on: !dependencies
target: Avhongur av: !dependencies

en: @module (<span class="admin-disabled">disabled</span>)
target: @module (<span class="admin-disabled">óvirkjað</span>)

en: @module (<span class="admin-enabled">enabled</span>)
target: @module (<span class="admin-enabled">virkjað</span>)

en: filter
target: filtur

en: HTTP request status
target: HTTP umbønarstøða

en: Fails
target: Miseydnast

en: Your system or network configuration does not allow Drupal to access web pages, resulting in reduced functionality. This could be due to your webserver configuration or PHP settings, and should be resolved in order to download information about available updates, fetch aggregator feeds, sign in via OpenID, or use other network-dependent services.
target: Kervið ella netsamansetingin loyvir ikki Drupal at fáa atgongd til heimasíður, sum viðførir verri virkisføri. Hetta kann vera vegna heimasíðusamansetingina ella setingar í PHP, og eigur at loysast til at fáa tikið niður upplýsingar um tøkar dagføringar, fáa fatur á keldur, rita inn við OpenID ella nýta aðrar tænastur sum krevja alnetsamband.
