Masonry API (7.x-1.1) - en to unknown language translation catalogue (7 entries)

en: User interface
target: Interface do utilizador

en: Disabled
target: Desativado

en: Enabled
target: Ativado

en: Yes
target: Sim

en: No
target: Não

en: Container
target: Recipiente

en: Duration
target: Duração
