Maxlength (7.x-3.3) - en to unknown language translation catalogue (3 entries)

en: Fields
target: 欄位

en: The maximum length of the field in characters.
target: 欄位字元最大長度。

en: !name cannot be longer than %max characters but is currently %length characters long.
target: !name 不能超過 %max 字元 (您目前輸入了 %length 字元)。
