Measuremail (7.x-1.0-beta4) - en to unknown language translation catalogue (6 entries)

en: Language
target: Mál

en: Error
target: Feilur

en: English
target: Enskt

en: French
target: Franskt

en: Dutch
target: Hollendskt

en: German
target: Týskt
