Mini Panel Reference (7.x-1.0) - en to unknown language translation catalogue (7 entries)

en: Default
target: Padrão

en: Fields
target: Campos

en: Contains
target: Contendo

en: Size of textfield
target: Tamanho do campo de texto

en: Autocomplete text field
target: Campo de texto com autocompletar

en: Autocomplete matching
target: Busca do autocompletar

en: Starts with
target: Começa com
