Mobile Switch Block (7.x-2.0-beta1) - en to unknown language translation catalogue (6 entries)

en: User interface
target: Interface de usuário

en: view
target: ver

en: version
target: versão

en: default
target: padrão

en: standard
target: padrão

en: Cookie lifetime
target: Tempo de vida do cookie
