Monitoring (7.x-1.0-beta2) - en to unknown language translation catalogue (27 entries)

en: Title
target: Yvirskrift

en: Save configuration
target: Goym samanseting

en: Status
target: Støða

en: Actions
target: Gerðir

en: Description
target: Lýsing

en: Log
target: Gerðalisti

en: more
target: meira

en: Disabled
target: Óvirkjað

en: Enabled
target: Virkjað

en: Yes
target: Ja

en: No
target: Nei

en: Overview
target: Yvirlit

en: Reset
target: Tómstilla

en: Message
target: Boð

en: Category
target: Bólkur

en: Settings
target: Setingar

en: Save
target: Goym

en: Timestamp
target: Tíðarmerki

en: Unknown
target: Ókent

en: All
target: Øll

en: Details
target: Nágreining

en: ‹ previous
target: ‹ fyrra

en: next ›
target: næsta ›

en: « first
target: « fyrsta

en: last »
target: síðsta »

en: page not found
target: síða ikki funnin

en: Status message
target: Støðuboð
