Multifield (7.x-1.0-alpha4) - en to unknown language translation catalogue (16 entries)

en: Delete
target: Slett

en: Operations
target: Handlinger

en: Cancel
target: Avbryt

en: Remove
target: Fjern

en: Description
target: Beskrivelse

en: Edit
target: Rediger

en: None
target: Ingen

en: This action cannot be undone.
target: Denne handlinga kan ikke gjøres om.

en: Label
target: Etikett

en: Save
target: Lagre

en: Default
target: Standard

en: Fields
target: Felt

en: Machine name
target: Maskinnavn

en: These settings apply to the %field field everywhere it is used.
target: Disse innstillingene brukes for feltet %field overalt.

en: Manage display
target: Administrer visning

en: View mode
target: Visningsmodus
