Multifield (7.x-1.0-unstable3) - en to unknown language translation catalogue (5 entries)

en: Remove
target: Remover

en: Description
target: Descrição

en: Default
target: Padrão

en: View mode
target: Modo de exibição

en: Remove item callback
target: Remover chamada de item
