mydigipass (7.x-1.6) - en to unknown language translation catalogue (4 entries)

en: The configuration options have been saved.
target: Indstillingerne er blevet gemt.

en: Continue
target: Fortsæt

en: Custom
target: Tilpasset

en: Account settings
target: Kontoindstillinger
