Nagios monitoring (7.x-1.4) - en to unknown language translation catalogue (8 entries)

en: Modules
target: 模組

en: Unknown
target: 未知

en: Warning
target: 警告

en: Unauthorized
target: 未經授權

en: Not configured
target: 未配置

en: Critical
target: 嚴重

en: Requires: !module-list
target: 依賴模組：!module-list

en: Required by: !module-list
target: 被用於模組：!module-list
