404 Navigation (7.x-1.0) - en to unknown language translation catalogue (2 entries)

en: Page not found
target: Cha deach an duilleag a lorg

en: The requested page could not be found.
target: Cha b' urrainn dhuinn an duilleag a dh'iarr thu a lorg.
