New Relic RPM Integration (7.x-1.0-alpha3) - en to unknown language translation catalogue (8 entries)

en: Enable
target: Aktiver

en: Disable
target: Deaktiver

en: Overview
target: Oversikt

en: Configure
target: Konfigurer

en: API Key
target: API-nøkkel

en: Exists
target: Eksisterer

en: Available
target: Tilgjengelig

en: Not set
target: Ikke satt
