U.S. National Weather Service (NOAA NWS) U.S. weather forecast block (7.x-1.0) - en to unknown language translation catalogue (3 entries)

en: Save configuration
target: Guardar configuração

en: N/A
target: N/D

en: Display name
target: Nome da vista
