Open Atrium Radix (7.x-2.0-beta1) - en to unknown language translation catalogue (8 entries)

en: Home
target: Início

en: Content
target: Conteúdo

en: Search
target: Pesquisar

en: Help
target: Ajuda

en: Footer
target: Rodapé

en: Filter
target: Filtro

en: Navigation
target: Navegação

en: Primary tabs
target: Separadores primários
