OpenID Connect / OAuth client (7.x-1.0-beta9) - en to unknown language translation catalogue (4 entries)

en: Save configuration
target: Guardar configuração

en: Status
target: Estado

en: None
target: Nenhum

en: Generic
target: Genérico
