OpenID ICAM Extension (7.x-1.5) - en to unknown language translation catalogue (3 entries)

en: OpenID Login
target: OpenID log ind

en: OpenID login failed.
target: OpenID log ind mislykkedes.

en: OpenID login cancelled.
target: OpenID log ind annulleret.
