OpenLucius LDAP (7.x-1.0-rc3) - en to unknown language translation catalogue (3 entries)

en: An error occurred
target: 发生了一个错误

en: Display name
target: 显示名称

en: %name: found no valid user with that name.
target: %name:未找到具有该名字的用户
