OptimizeDB (7.x-1.0-beta2) - en to unknown language translation catalogue (4 entries)

en: Development
target: Desenvolvimento

en: Disabled
target: Desativado

en: Optimize tables
target: Otimizar tabelas

en: None
target: Nenhum
