Panels Custom Error (7.x-1.0-beta1) - en to unknown language translation catalogue (2 entries)

en: You are not authorized to access this page.
target: Oñnortú sófa ibá saibor ejazot nái.

en: The requested page "@path" could not be found.
target: Dorhás goijjá sófa "@path" tuaifaa nóza.
