Panels Custom Error (7.x-1.0-beta1) - en to unknown language translation catalogue (3 entries)

en: You are not authorized to access this page.
target: 您未被授权访问此页面。

en: Panels
target: 面板

en: The requested page "@path" could not be found.
target: 无法找到请求的页面 "@path" 。
