Patch manager (7.x-1.0) - en to unknown language translation catalogue (13 entries)

en: Title
target: Tiotal

en: Development
target: Leasachadh

en: List
target: Liosta

en: Description
target: Tuairisgeul

en: more
target: barrachd

en: Reset
target: Ath-shuidhich

en: Add
target: Cuir ris

en: Path
target: Slighe

en: Configure
target: Rèitich

en: Created
target: Air a chruthachadh

en: Module
target: Mòideal

en: Defaults
target: Bun-roghainnean

en: Sort by
target: Seòrsaich a-rèir
