Performance Logging and Monitoring (7.x-1.1) - en to unknown language translation catalogue (14 entries)

en: enabled
target: ativo

en: Development
target: Desenvolvimento

en: Cancel
target: Cancelar

en: Disabled
target: Desativado

en: Enabled
target: Ativado

en: Yes
target: Sim

en: No
target: Não

en: Date
target: Data

en: No log messages available.
target: Não há mensagens no registo.

en: Summary
target: Resumo

en: Path
target: Caminho

en: Last access
target: Último acesso

en: Details
target: Detalhes

en: Other
target: Outro
