Radix Full-Width (7.x-1.3) - en to unknown language translation catalogue (5 entries)

en: Dimensions
target: Dimensões

en: Minimum height
target: Altura mínima

en: Full Width
target: Largura Total

en: Flexible
target: Flexível

en: Speed
target: Velocidade
