Radix Full-Width (7.x-1.2) - en to unknown language translation catalogue (4 entries)

en: Dimensions
target: Størrelse

en: Minimum height
target: Minimal høyde

en: Full Width
target: Full bredde

en: Flexible
target: Fleksibel
