rcSwitcher (7.x-1.0) - en to unknown language translation catalogue (7 entries)

en: User interface
target: Brukergrensesnitt

en: Theme
target: Utseendemal

en: Width
target: Bredde

en: Height
target: Høyde

en: Installed
target: Installert

en: Apply
target: Bruk

en: About
target: Om
