Real AES (7.x-1.2) - en to unknown language translation catalogue (4 entries)

en: No initialization vector found while trying to decrypt. Aborting!
target: 尝试解密时无法找到初始化向量。放弃！

en: Not Installed
target: 未安装

en: Installed
target: 已安装

en: Tried to decrypt an empty string.
target: 试图解密一个空字符串。
