Recline (7.x-1.1) - en to unknown language translation catalogue (4 entries)

en: Installed
target: Terpasang

en: Upload destination
target: Destinasi muat naik

en: Select where the final files should be stored. Private file storage has significantly more overhead than public files, but allows restricted access to files within this field.
target: Pilihkan di mana fail-fail terakhir patut disimpan. Storan fail peribadi, secara signifikan, mempunyai lebih overhed daripada fail-fail awam, tetapi ia membolehkan capaian terbatas ke fail-fail dalam medan ini.

en: Add a new file
target: Tambahkan fail baharu
