Redirects 404 (7.x-1.1) - en to unknown language translation catalogue (3 entries)

en: Page not found
target: Side ikke funnet

en: The path '%path' is either invalid or you do not have access to it.
target: Stien «%path» er enten ugyldig, eller du har ikke tilgang til den.

en: Redirect 404
target: Viderekoble 404
