Responsive Image Styles for Drupal (7.x-1.1) - en to unknown language translation catalogue (2 entries)

en: Image scale failed using the %toolkit toolkit on %path (%mimetype, %dimensions)
target: Falha na alteração da escala da imagem, usando o %toolkit toolkit em %path (%mimetype, %dimensions)

en: Responsive image
target: Imagem responsiva
